Water Stress Indicator < 0.3 0.3 - 0.4 0.4 - 0.5 0.5 - 0.6 0.6 - 0.7

Major River Basins

No discharge

0.7 - 0.8 0.8 - 0.9 0.9 - 1 >= 1

Low

High